1 1.2 1.4 1.6 1.8 2 2.2 2.4 2.6 2.8 3 0

100

200

300

400

500

600

700

800

900

1000

Odds Ratio

No. of Null rejections fpr=0.01, fnr=0.2

Observed data Inferred true data