1 2 3 4 5

x 10^{-3} 0.2 0.25 0.3 0.35 0.4 0.5 0.52

0.54

0.56

0.58 0.6 0.62

0.64

0.66

0.68

FPR

Observed positive specific agreement=0.3783784

FNR

Inferred True positive specific agreement