1 2 3 4 5

x 10^{-3} 0.2 0.25 0.3 0.35 0.4 0.65 0.7 0.75 0.8 0.85 0.9 0.95 1

FPR

Observed positive specific agreement=0.5322

FNR

Inferred True positive specific agreement