0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0 0 50 100 150 200 250 300 350

Number of known complexes

Overlapping Score

MCL MCODE CPM SPICI COACH HC-PIN TSN-PCD