2 4 6 8 10 12 14 16 18 20 22 24 26 28 30 32 34 36 0 10 20 30 40 50 60 70 80

5 10 15 20 25 30 35 0

100

200

300

400

500

Number of TSNs in which the same protein complex is detected

Number of protein complexes

Number of protein complexes

Number of TSNs in which the same protein complex is detected