0.2 0.4 0.6 0.8

0.2 0.4 0.6 0.8 1

d relative connectivity

|A|=50

0.58

0.6

0.60.62

0.62

0.62

0.64

0.64

0.66

0.66

0.66

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.68

0.70.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.7

0.72

0.72

0.2 0.4 0.6 0.8

0.2 0.4 0.6 0.8 1

d

|A|=100

0.65

0.7

0.7

0.75

0.75

0.8

0.8

0.85

0.85

0.85

0.85

0.85

0.85

0.85

0.85

0.85

0.9

0.9

0.9

0.9

0.9

0.2 0.4 0.6 0.8

0.2 0.4 0.6 0.8 1

d

|A|=200

0.6

0.65

0.7

0.7

0.75

0.75

0.8

0.8

0.8

0.8

0.8

0.8

0.8

0.8

0.85

0.85

0.85

0.85

0.85

0.85

0.2 0.4 0.6 0.8

0.2 0.4 0.6 0.8 1

d

|A|=500

0.55

0.55

0.55

0.55

0.6

0.6

0.6

0.65

0.65

0.65

0.65

0.65

0.65

0.65

0.65

0.7

0.7

0.7

0.7

0.7

0.7

0.7