0 20 40 R000 dR000

0 0.2 0.4 R0P0 dR0P0

0 0.2 0.4 R00P dR00P

0 0.1 0.2 R0PP dR0PP

0 20 40 RL00 dRL00

0 5 10 RL0P dRL0P

0 20 40 RLPP dRLPP

0 10 20 RLP0 dRLP0

0 20 40 RXE dRXE

0 0.2 0.4 RXEP dRXEP

200

250 rE dE

0 1 2 rEP drEP

60 120 180 240 300 0 2 4 XEF dXEF

60 120 180 240 300 46 48 50 rF dF

60 120 180 240 300 0 0.2 0.4 DLPF rDLPF