-0.15 -0.1 -0.05 0 0.05

-0.1

-0.08

-0.06

-0.04

-0.02

0

0.02

0.04

0.06

0.08

LV1: 8.0% explained X-variance

LV2: 2.8% explained X-variance

Not significant by T^2 Significant by SAM and T^2 Significant by T^2, not by SAM