age [wks]

D [μm]

0 20 40 60 80 0 200 400 600 800 1000

1200

(a) age [wks]

D [μm] hind fore

0 20 40 60 80 0 200 400 600 800 1000

(b)

age [wks]

D [μm] lateral medial

0 20 40 60 80 0 200 400 600 800 1000

(c) age [wks]

D [μm] caudal distal rostral

0 20 40 60 80 0 200 400 600 800 1000

(d)