depth [ μm] ϕ [^∘ ]

0 wks 2 wks 4 wks 8 wks 12 wks 20 wks 28 wks 36 wks 52 wks 72 wks

0 200 400 600 800 1000 100

120

140

160

180

(a)

depth [ μm] age [weeks]

0 10 20 30 40 50 60 70

100^∘

120^∘

140^∘

160^∘

180^∘ 0 200

400

600

800 1000

(b)