0.86 0.88 0.9 0.92 0 20 40 60 80 100 120 140 160

Sensitivity

#Genomes

0.5 0.54 0.58 0.62 0.66 0.7 0.74 0 20 40 60 80 100 120 140 160 180

Specificity