0

2000

4000

6000 number of CLOGs

Aca11017

Mic843

Nos7120 Cyn51142 Cyn8801

Glo7421 Trich101 Syn6803 Syc7002 SycJA23

Syc7942 Syc7803

ThermoBP1 Pro9215 ProMED4 Pro9211

CLOGs with EC number

CLOGs without EC number

0 1000 2000 3000 4000 0 200 400 600 800 1000

number of CLOGs without assigned EC number number of EC CLOGs

A

B