wt L1 L2 L3 L4 S1 S2 S3 S4 0

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

introns inserted into RPS17B gene normalized level of protein expression

Protein expression results for new RPS17B intron mutants