0 0.2 0.4 0.6 0.8 1 0 0.2 0.4 0.6 0.8 1

False Positive Rate

True Positive Rate

Predicting Contacts on Test Set 1

S* FOLDpro MGTH RAPTOR FUGUE3 ST02 SPARK3

0 0.2 0.4 0.6 0.8 1 0 0.2 0.4 0.6 0.8 1

False Positive Rate

Predicting Contacts on Test Set 2

S* FOLDpro MGTH RAPTOR FUGUE3 ST02 SPARK3

0 0.2 0.4 0.6 0.8 1 0 0.2 0.4 0.6 0.8 1

False Positive Rate

Predicting Contacts on Test Set 3

S* FOLDpro MGTH RAPTOR FUGUE3 ST02 SPARK3

0 0.2 0.4 0.6 0.8 1 0 0.2 0.4 0.6 0.8 1

False Positive Rate

Predicting Contacts on Test Set 4

S* FOLDpro MGTH RAPTOR FUGUE3 ST02 SPARK3