Parenchyma

Air Airway wall

Plane of symmetry electrically and thermally insulated

Plane of symmetry thermally insulated v = 0

Parenchyma

Electrode

Air

Outer surface Temperature = body temperature electrically insulated

v = control voltage and Temperature control point . .