No Injection

CD34 + CD38 - / dim c-mpl - CD34 + CD38 - / dim c-mpl +

CD4

+

CD8

+

CD4

-

CD8

+

0

10

20 30 40 50

60

70

Viable CD4 CD8 Subsets

% Donor HLA

0.0

0.5

1.0

1.5

2.0

2.5

3.0

5.0 5.5 6.0 6.5 7.0 7.5 8.0

8.5

9.0

9.5

Viable

CD2

+

Cells

% Donor HLA

A B