0 1 2 3 4 5 6 7 8 270 280 290 300 310 320 330 340 350

Length [nm]

Temperature [K] Heat flux [W]

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2x 10

Temperature

Heat Flux

Bond

Free-end

Equilibrium position Particle Free-end

Deviation from equilibrium

1D lattice chain:

x