0 50 100 150 200

400

600

Temperature [K]

Time evolution of temperature

CNT (MD) Water (MD)

0 50 100 150

10^1

10^2

10^3

Time[ps]

Exponetial decay of temperature difference

Temperature difference (MD) Exponential decay. Time constant: 41[ps]