0.1 0.15 0.2 0.25 0.3 0.35 0.4 0.45 0.5 0

0.005

0.01

0.015

0.02

0.025

the standard deviation of NLOS error/m

Average CRLB/m 2

NLOS error-Gaussian distribution

LOS CRLB NLOS CRLB