0 0.5 1 1.5 2 2.5 0 0.5 1 1.5 2 2.5 3

C(γ_{1R})

Network Coding No Network Cod.

Optimal

Sum-Rate

Optimal

Rate-Alloc.

ρ_* ρ_*