0 10 20 30 40 50 60 70 80 0

100

200

Time (hrs)

Experiment (dpm/ μl)

Albumin = 61.9188% Lipoproteins = 38.0812%

0

0.05

0.1

Simulation (mg/l)

Experimental data Simulated data