0 5 10 15 20 25 30 0 1 2 3 4 5 Ankle Joint Viscosity

[Nms/rad]

0.25 0.5 1.0 2.0 0

20

40

60

80

c 0 1 2+

Ankle Joint Stiffness

[Nm/rad]

Movement Duration [s]