-10 -5 0

FCO2

0 500 1000

Rg [W m -2]

-100 0 100 200 300

LE [W m

0 250 500

Rn [Wm

0 200 400

H [W m-

0 1000

2000

PPFD

20 30 40

Ta [°C]

0 2.5 5

VPD

0 6 12 18 24 0 50 100

Time of day [h]

Rh [%]

0 6 12 18 24

0.06

0.07

0.08

Time of day [h]

Vol. soil moisture