0 6 12 18 24 -12 -10 -8 -6 -4 -2 0 2 4

Time of day [h]

Pg, Re [ μmol CO 2 m-1 s-1]

Dry

0 6 12 18 24 -12 -10 -8 -6 -4 -2 0 2 4 Wet

Time of day [h]

Pg,Re [

Re Pg Re Pg