0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

False positive rate

True positive rate

SNAD-IDF

Spectral-IDF

Spectral-Binary

SNAD-Binary