5 10 15 20 25 30 35 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6

Microstructure Total variation

Variance Modulus C 11 (GPa 2)

Variance from FFT Linear Prediction r^2=0.72 90% Prediction Bounds