16 18 20 16 18 20 22 24 26 28 30 32

Reduced Order Model C^{11} (GPa)

FFT C

11 (GPa)

Accuracy of Reduced Order C^{11} Model

Class 1

Class 2

Class 3

Class 4

Class 5

Class 6

Class 7

Class 8